Subject

Processing Power Requirements

CPU (MIPS) In 1997

CPU (MIPS) In 2006

Triggering Level-2 Level-3

4 x 10^5 1 x 10^6

Reconstruction Real data Simulated data 200

1.6 x 10^6 2 x 10^5

Simulation B-meson Background 600 - 1.2 x 10^6 1.2 x 10^3

Analysis Real data Simulated data - 150 5 x 10^4 5 x 10^5

Total 950 ~ 5 x 10^6